)c (GeV/ Tp 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

eff × ITS tracking acc

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 +π

0-5% 70-80%

(a)